0.3 0.225

0.15

0.075 0 -3.88e+06

-3.36e+06

-2.85e+06

-2.33e+06

-1.81e+06

-1.29e+06

-7.77e+05

-2.59e+05

2.58e+05

7.76e+05

1.29e+06

1.81e+06

2.33e+06

2.85e+06

3.36e+06

3.88e+06 e (2)